1000 1200 1400 1600 1800

-1000

-800

-600

-400

12/13Al + 4/13Si+ O_2 = 2/13Al_6Si_2O_{13}

3/2Fe + O_2 = 1/2Fe_3O_4

4/3Fe + O_2 = 2/3Fe_2O_3

4/3Al + O_2 = 2/3Al_2O_3

Ti + O_2 = TiO_2

Delta G(kJ/mol)

Temperature/K

2Ca + O_2= 2CaO